% Style parameters and macros used by all documents here

% Page lay-out parameters
\textwidth = 160mm
\textheight = 240mm
\topmargin = -11mm
\oddsidemargin = 0mm
\evensidemargin = 0mm
%\parindent = 0mm

% Frequently used system names
\newcommand{\Python}{Python} % Sometimes I want this italicized
\newcommand{\UNIX}{U{\sc nix}}

% Variable used by begin code command
\newlength{\codewidth}

\newcommand{\bcode}{
 % Calculate the text width for the minipage:
 \setlength{\codewidth}{\linewidth}
 \addtolength{\codewidth}{-\parindent}
 %
 \vspace{3mm}
 \par
 \indent
 \begin{minipage}[t]{\codewidth}
}

\newcommand{\ecode}{
 \end{minipage}
 \vspace{3mm}
 \par
 \noindent
}
